-- 生产环境新增列
ALTER TABLE sys_login_log ADD COLUMN real_name VARCHAR(64) DEFAULT NULL COMMENT '用户真实姓名' AFTER username;
ALTER TABLE sys_operation_log ADD COLUMN response_body TEXT DEFAULT NULL COMMENT '接口返回报文（截断至2000字符）' AFTER error_msg;
